import PageMeta from "../../components/common/PageMeta";
import PageHeader from "../../components/common/PageHeader";
import ComponentCard from "../../components/common/ComponentCard";
import { ImageIcon } from "../../icons";

export default function ImageTesting() {
  return (
    <>
      <PageMeta title="Image Settings - IGNY8" description="Configure image generation" />
      <PageHeader 
        title="Image Settings" 
        badge={{ icon: <ImageIcon />, color: 'indigo' }}
        breadcrumb="Thinker / Image Testing"
        selectorVisibility="none"
      />
      <ComponentCard title="Coming Soon" desc="AI image testing">
        <div className="text-center py-8">
          <p className="text-gray-600 dark:text-gray-400">
            Image Testing - Coming Soon
          </p>
          <p className="text-sm text-gray-500 dark:text-gray-400 mt-2">
            Test and configure AI image generation capabilities
          </p>
        </div>
      </ComponentCard>
    </>
  );
}

